40 35 30 25 20 15 10 5

Depth (m)

-20

-20-20

-20

-20

2020

20

20

20

20

20

2020

20

2020

20

20

20

20

20

20

40

East/West component

1 3 5 7 9 11 13 15 17 19 21 23 25 27 29 31

40 35 30 25 20 15 10 5

March 1994

-20

-20

-20

-20

-20

-20

-20

-20

-20

-20

-20

-20

-20

-20-20

-20

-20

-20

-20

20

20

20

North/South component

Current Velocity (cm/s)

March 1994 isotachs of U (east/west) and V (north/south) components of currents measured at USF buoy PM13.